<template>
	<view>

		<view class="background">
			<u-picker-select title="日期选择" v-model="tabsFrom.show2"
			 :defaultTime="tabsFrom.show2Index" :endYear="endYear"
			 mode="time" :params="params"  @confirm="selector2confirm" @reset="selector2reset" ></u-picker-select>
			
			<u-navbar :background="background" back-icon-color="#fff" title="联通公司" title-color="#fff">
				<view class="u-nav-slot" slot="right" @click="tabsFrom.show2=true,params.day=true">
					<image class="img" src="@/assets/img/riLine-calendar-todo-line 1.svg" mode=""></image>
				</view>
			</u-navbar>
			<!-- 日期 -->
			<view class="date-box">
				<view class="item item-today">
					<view class="date">
						26
					</view>
					<view class="week ">
						今天
					</view>
					<view class="dot">
						
					</view>
				</view>
				<view class="item">
					<view class="date">
						27
					</view>
					<view class="week">
						周六
					</view>
				</view>
				<view class="item">
					<view class="date">
						28
					</view>
					<view class="week">
						周日
					</view>
				</view>
				<view class="item">
					<view class="date">
						29
					</view>
					<view class="week">
						周一
					</view>
				</view>
				<view class="item">
					<view class="date">
						30
					</view>
					<view class="week">
						周二
					</view>
				</view>
			</view>

		</view>
		<!-- 用电量 -->
		<view class="electricity-consumption">
			<view class="title">
				用电量统计(kW·h)
			</view>
			<view class="degree">
				<view class="item">
					<view class="item-text">
						百万
					</view>
					<view class="item-number">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾万
					</view>
					<view class="item-number">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						万
					</view>
					<view class="item-number">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						千
					</view>
					<view class="item-number">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						百
					</view>
					<view class="item-number">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾
					</view>
					<view class="item-number">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						1
					</view>
					<view class="item-number">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						0.1
					</view>
					<view class="item-number decimal">
						7
					</view>
				</view>
			</view>
			
			<view class="radio">
				<u-radio-group v-model="value" @change="radioGroupChange">
					<u-radio @change="radioChange" v-for="(item, index) in list" :key="index" :name="item.id"
						:disabled="item.disabled">
						{{item.name}}
					</u-radio>
				</u-radio-group>
			</view>
		</view>
		<!-- 各时段用电量 -->
		<view class="electricity-chart">
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					各时段用电量 (度)

				</view>
			</view>
			<view class="chart">
				<image class="img" src="@/assets/img/chart@1x.png" mode=""></image>
			</view>
		</view>
		<!-- 异常波动 -->
		<view class="abnormal"  v-if="false">
			<view class="headline">
				<view class="title">
					
					<view class="text">
						异常波动
					</view>
				</view>
				<view class="more">
					查看全部
					<u-icon name="arrow-right" size="24" color="#d4d4d4"></u-icon>
				</view>
			</view>

			<view class="details">
				<view class="item">
					<view class="name">
						温度异常报警
					</view>
					<view class="time">
						2024-01-25 15:00:00
					</view>
				</view>

				<view class="item">
					<view class="name">
						三厢功率因数异常报警
					</view>
					<view class="time">
						2024-01-05 20:00:00
					</view>
				</view>
			</view>


		</view>

		<!-- 能源监测 -->
		<view class="energy-inspection"  v-if="false">
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					能源监测

				</view>
			</view>
			<view class="grid">
				<u-grid :col="3" :border="false">
					<u-grid-item>
						<view class="icon icon2">
							<image class="img" src="@/assets/img/Image@1.png" mode=""></image>
						</view>
						<view class="grid-text">三相电流</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon2">
							<image class="img" src="@/assets/img/Image@2.png" mode=""></image>
						</view>
						<view class="grid-text">三相电压</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon3">
							<image class="img" src="@/assets/img/Image@3.png" mode=""></image>
						</view>
						<view class="grid-text">三相温度</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon4">
							<image class="img" src="@/assets/img/Image@4.png" mode=""></image>
						</view>
						<view class="grid-text">三相有功功率</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon5">
							<image class="img" src="@/assets/img/Image@5.png" mode=""></image>
						</view>
						<view class="grid-text">三相功率因数</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon6">
							<image class="img" src="@/assets/img/Image@5.png" mode=""></image>
						</view>
						<view class="grid-text">平均功率因数</view>
					</u-grid-item>
				</u-grid>
			</view>
		</view>
		<!-- 数据分析 -->
		<view class="data-analysis"  v-if="false">
			<view class="title">
				<view class="icon">
		
				</view>
				<view class="text">
					数据分析
		
				</view>
			</view>
			<view class="grid">
				<u-grid :col="3" :border="false">
					<u-grid-item>
						<view class="icon icon7">
							<image class="img" src="@/assets/img/Image@7.png" mode=""></image>
						</view>
						<view class="grid-text">同比分析</view>
					</u-grid-item>
					<u-grid-item>
						<view class="icon icon8">
							<image class="img" src="@/assets/img/Image@8.png" mode=""></image>
						</view>
						<view class="grid-text">环比分析</view>
					</u-grid-item>	
				</u-grid>
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				endYear:'',
				params: {
					year: true,
					month: true,
					day: true,
					hour: false,
					minute: false,
					second: false
				},
				tabsFrom: {
					show1: false,
					show1Index:0,
					show2Index:'',
					show2: false,
					show1Text: "全部类型",
					show2Text: "全部时间",
					selector1:[
						{
								label: '全部类型',
								value: '',
							},
						{
								label: '线上充值',
								value: '1',
							},
							{
								label: '线下充值',
								value: '2',
							},
					]
				},
				background: {
					backgroundColor: '#1677FF',
				},
				list: [{
						id:0,
						name: '总用电量',
						disabled: false
					},
					{
						id:1,
						name: '当日用电量',
						disabled: false
					},
					{
						id:2,
						name: '当月用电量',
						disabled: false
					}, {
						id:3,
						name: '当年用电量',
						disabled: false
					}, {
						id:4,
						name: '去年用电量',
						disabled: false
					}, {
						id:5,
						name: '指定月份',
						disabled: false
					}
				],
				// u-radio-group的v-model绑定的值如果设置为某个radio的name，就会被默认选中
				value: 'orange',
			};
		},
		onLoad() {
			this.endYear=new Date().getFullYear()
			
		},
		methods: {
			selector2confirm(e){
				this.tabsFrom.show2Text=e.year+"年"+e.month+"月"
				
				this.tabsFrom.show2Index=e.year+"-"+e.month
				if(e.day){
					this.tabsFrom.show2Text+=e.day+"日"
					this.tabsFrom.show2Index+='-'+e.day	
				}
			},
			selector2reset(e){
				console.log(e)
				this.tabsFrom.show2Text='全部时间'
				this.tabsFrom.show2Index='';
			},
			// 选中某个单选框时，由radio时触发
			radioChange(e) {
				 //console.log(e);
			},
			// 选中任一radio时，由radio-group触发
			radioGroupChange(e) {
				 console.log(e);
				 if(e==5){
					 this.tabsFrom.show2=true
					 this.params.day=false
				 }
			}
		}
	};
</script>


<style lang="scss" scoped>
	page {
		padding-bottom: 100rpx;
	}

	.background {
		background-color: rgba(22, 119, 255, 1);
		padding-bottom: 100rpx;



		/deep/.u-border-bottom:after {
			border: none;
		}

		.u-nav-slot {
			margin-right: 32rpx;

			.img {
				width: 48rpx;
				height: 48rpx;
				vertical-align: middle;
			}
		}


	}


	.background::after {
		content: '';
		position: absolute;
		width: 160%;
		height: 80px;
		background-color: rgba(22, 119, 255, 1);
		left: -30%;
		border-radius: 0 0 50% 50%;

	}

	// // 日期
	.date-box {
		display: flex;
		align-items: center;
		justify-content: space-between;
		margin: 24rpx 32rpx;


		.item {
			border-radius: 8px;
			background-color: rgba(255, 255, 255, 0.1);
			border: 1px solid rgba(255, 255, 255, 0.15);
			width: 120rpx;
			height: 120rpx;
			color: #fff;
			text-align: center;
			display: flex;
			flex-direction: column;
			justify-content: center;

			.date {
				font-size: 40rpx;


			}

		}

		.item-today {
			background-color: rgba(255, 255, 255, 1);
            position: relative;
			.date {
				color: rgba(22, 119, 255, 1);
			}

			.week {
				color: rgba(16, 16, 16, 1);
			}
			.dot{
				width: 10rpx;
				height: 10rpx;
				background-color: rgba(255,150,0,1);
				border-radius: 999px;
				position: absolute;
				bottom: -5rpx;
				left: 50%;
				transform: translateX(-50%);
			}
		}
	}

	// 用电量
	.electricity-consumption {
		background-color: #fff;
		padding: 40rpx 32rpx 0rpx;
		border-radius: 8px;
		margin: -88rpx 32rpx 0;
		position: relative;
        .title{
			color: rgba(16,16,16,1);
			font-size: 36rpx;
		}
		.degree{
			display: flex;
			margin-top: 32rpx;
			.item{
				margin-right: 6rpx;
				text-align: center;
				.item-text{
					color: rgba(16,16,16,1);
				}
				.item-number{
					margin-top: 24rpx;
					width: 72rpx;
					height: 96rpx;
					background-color: rgba(16,16,16,1);
					color: #fff;
					font-size: 72rpx;
					
				}
				.decimal{
					background-color: #900005;
				}
			}
		}
		

		// .tab {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #fff;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 0rpx;
		// 	right: 0rpx;
		// 	color: #101010;
		// 	color: rgba(16, 16, 16, 1);
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	z-index: 999;
		// 	text-indent: 16rpx;
		// }

		// .tab2 {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #D4DBE4;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 210rpx;
		// 	right: 0rpx;
		// 	color: #777777;
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	text-indent: 16rpx;
		// }

		.radio {
			margin-top: 24rpx;

			/deep/.u-radio__label {
				font-size: 24rpx
			}

			/deep/.u-radio {
				margin-bottom: 16px;
				width: 200rpx !important;
			}

		}
	}

	//各时段用电量
	.electricity-chart {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			padding: 0 32rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(22, 119, 255, 1);
				border: 6px solid rgba(182, 212, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.chart {
			width: 100%;
			height: 440rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}
	}

	// 异常
	.abnormal {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.headline {
			display: flex;
			align-items: center;
			justify-content: space-between;
		}

		.title {
			display: flex;
			align-items: center;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(22, 119, 255, 1);
				border: 6px solid rgba(182, 212, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.more {
			color: #838383;
			font-size: 24rpx
		}

		.details {
			margin-top: 40rpx;

			.item {
				display: flex;
				align-items: center;
				justify-content: space-between;
				margin-top: 32rpx;

				.name {
					color: rgba(51, 51, 51, 1);
				}

				.time {
					color: rgba(119, 119, 119, 1);
					font-size: 24rpx;
				}
			}
		}

	}

	// 能源监测
	.energy-inspection,.data-analysis {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(22, 119, 255, 1);
				border: 6px solid rgba(182, 212, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.grid {
			.icon {
				width: 128rpx;
				height: 128rpx;
				border-radius: 12px;
				background-color: rgba(35, 186, 178, 1);
				display: flex;
				align-items: center;
				justify-content: center;
				margin-bottom: 16rpx;

				.img {
					width: 80rpx;
					height: 80rpx;
				}
			}
			.icon2{
				background-color: rgba(42,186,72,1);
			}
			.icon3{
				background-color: rgba(78,96,246,1);
			}
			.icon4{
				background-color: rgba(22,119,255,1);
			}
			.icon5{
				background-color: rgba(35,186,178,1);
			}
			.icon6{
				background-color: rgba(42,186,72,1);
			}
			.icon7{
				background-color: rgba(22,119,255,1);
			}
			.icon8{
				background-color: rgba(35,186,178,1);
			}

			.grid-text {
				color: #333333;
			}
		}
	}
</style>