<template>
	<view>
		<view class="background">
			<!-- 日期选择器 -->
			<u-picker-select title="日期选择" v-model="tabsFrom.show2" :defaultTime="tabsFrom.show2Index" :endYear="endYear"
				mode="time" :params="params" :noselect="false" @confirm="selector2confirm" @cancel="selector2cancel"
				@reset="selector2reset">
			</u-picker-select>

			<view class="navbar-c">
				<view class="back" @click="backDataMonitoringList">
					<u-icon name="arrow-left" color="#fff" size="36"></u-icon>
				</view>
				<view class="title" @click="titleCk">
					{{tabsFrom.title}}
					<u-icon name="arrow-down" color="#fff" size="24"></u-icon>
				</view>
			</view>
		</view>

		<!-- 设备选择器 -->
		<u-select title="设备选择" v-model="tabsFrom.show1" mode="mutil-column-auto" :list="tabsFrom.selector1"
			@confirm="selector1confirm" cancel-text="重置" @cancel="selector1cancel">
		</u-select>

		<!-- 用电量 -->
		<view class="electricity-consumption">
			<view class="title">
				用电量统计 (度)
			</view>
			<view class="degree">
				<view class="item">
					<view class="item-text">
						百万
					</view>
					<view class="item-number" v-text="showTop[0]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾万
					</view>
					<view class="item-number" v-text="showTop[1]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						万
					</view>
					<view class="item-number" v-text="showTop[2]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						千
					</view>
					<view class="item-number" v-text="showTop[3]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						百
					</view>
					<view class="item-number" v-text="showTop[4]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾
					</view>
					<view class="item-number" v-text="showTop[5]">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						1
					</view>
					<view class="item-number" v-text="showTop[6]">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						0.1
					</view>
					<view class="item-number decimal" v-text="showTop[7]">
						7
					</view>
				</view>
			</view>

			<view class="radio">
				<u-radio-group v-model="value" @change="radioGroupChange">
					<u-radio @change="radioChange" v-for="(item, index) in list" :key="index" :name="item.id"
						:disabled="item.disabled">
						{{item.name}}
					</u-radio>
				</u-radio-group>
			</view>
		</view>
		<!-- 各时段用电量 -->
		<view class="electricity-chart">
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					各时段用电量 (度)

				</view>
				<view class="more" @click="tabsFrom.show2=true,params.day=true">
					{{queryDay}}<u-icon name="arrow-down"></u-icon>
				</view>
			</view>
			<view class="chart">
				<view id="barEcharts" style="min-height:440rpx;">

				</view>
			</view>
			<view style="text-align: center;background: white;">当日电量合计：{{sumQuantity}}度</view>
		</view>
		<!-- 异常波动 -->
		<view class="abnormal" v-if="abnormalRecordsList.length != 0">
			<view class="headline">
				<view class="title">
					<view class="icon">

					</view>
					<view class="text">
						异常告警
					</view>
				</view>
				<view class="more" @click="gotoUrl('/pages/abnormal/abnormalAlarmRecord?id='+companyId)">
					查看全部
					<u-icon name="arrow-right" size="24" color="#d4d4d4"></u-icon>
				</view>
			</view>

			<view class="details">
				<view class="item" v-for="(item, index) in abnormalRecordsList" :key="index"
					@click="gotoUrl('/pages/abnormal/abnormalAlarmDetails?id='+item.id)">
					<view class="name">
						{{item.configName}}
					</view>
					<view class="time">
						{{item.createTime}}
					</view>
				</view>
			</view>
		</view>

		<!-- 能源监测 -->
		<view class="energy-inspection">
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					能源监测

				</view>
			</view>
			<view class="grid">
				<u-grid :col="3" :border="false">
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','A','三相电流')">
						<view class="icon icon1">
							<image class="img" src="@/assets/img/Image@1.png" mode=""></image>
						</view>
						<view class="grid-text">三相电流</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','V','三相电压')">
						<view class="icon icon2">
							<image class="img" src="@/assets/img/Image@2.png" mode=""></image>
						</view>
						<view class="grid-text">三相电压</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','T','三相温度')">
						<view class="icon icon3">
							<image class="img" src="@/assets/img/Image@3.png" mode=""></image>
						</view>
						<view class="grid-text">三相温度</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','P','三相有功功率')">
						<view class="icon icon4">
							<image class="img" src="@/assets/img/Image@4.png" mode=""></image>
						</view>
						<view class="grid-text">三相有功功率</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','F','三相功率因数')">
						<view class="icon icon5">
							<image class="img" src="@/assets/img/Image@5.png" mode=""></image>
						</view>
						<view class="grid-text">三相功率因数</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('3PhaseCurrentDetails','AF','平均功率因数')">
						<view class="icon icon6">
							<image class="img" src="@/assets/img/Image@5.png" mode=""></image>
						</view>
						<view class="grid-text">平均功率因数</view>
					</u-grid-item>
				</u-grid>
			</view>
		</view>
		<!-- 数据分析 -->
		<view class="data-analysis">
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					数据分析

				</view>
			</view>
			<view class="grid">
				<u-grid :col="3" :border="false">
					<u-grid-item @click="gotoInfo('chartYoY','','')">
						<view class="icon icon7">
							<image class="img" src="@/assets/img/Image@7.png" mode=""></image>
						</view>
						<view class="grid-text">同比分析</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('chartMoM','','')">
						<view class="icon icon8">
							<image class="img" src="@/assets/img/Image@8.png" mode=""></image>
						</view>
						<view class="grid-text">环比分析</view>
					</u-grid-item>
					<u-grid-item v-if="false">
						<view class="icon icon9">
							<image class="img" src="@/assets/img/Image@9.svg" mode=""></image>
						</view>
						<view class="grid-text">用电统计</view>
					</u-grid-item>
				</u-grid>
			</view>
		</view>

		<!-- 设备信息 -->
		<view class="equipment-information">
			<view class="title">

				<view class="icon">

				</view>
				<view class="text">
					设备信息

				</view>
				<view class="more" @click="equipmentInfosShow=true">
					查看全部<u-icon name="arrow-right" size="24" color="#d4d4d4"></u-icon>
				</view>
			</view>

			<view class="infos">
				<view class="item">
					<view class="item-title">
						类型
					</view>
					<view class="item-value">
						变压器
					</view>
				</view>
				<view class="border">

				</view>
				<view class="item">
					<view class="item-title">
						设备编号
					</view>
					<view class="item-value">
						SN9015001
					</view>
				</view>
				<view class="border">

				</view>
				<view class="item">
					<view class="item-title">
						上次故障时间
					</view>
					<view class="item-value">
						2024-02-14
					</view>
				</view>
			</view>
		</view>
		<!-- 设备信息弹窗 -->

		<view class="equipment-popup">
			<u-popup v-model="equipmentInfosShow" mode="bottom" border-radius="12">
				<view class="content">
					<view class="headline">
						设备信息
					</view>
					<view class="infos">
						<view class="item">
							<view class="item-title">
								类型
							</view>
							<view class="item-value">
								变压器
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								编号
							</view>
							<view class="item-value">
								SN9015001
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								所属公司
							</view>
							<view class="item-value">
								荆鹏集团
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								地址
							</view>
							<view class="item-value">
								荆州市沙市区江津东路155号
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								上线时间
							</view>
							<view class="item-value">
								2024-01-01
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								上次故障时间
							</view>
							<view class="item-value">
								2024-02-14
							</view>
						</view>
					</view>
					<button class="get" @click="equipmentInfosShow=false">知道了</button>
				</view>
			</u-popup>

		</view>
		<!-- 故障上报 -->
		<view class="create-order">
			<view class="img-box">
				<image class="img" src="@/assets/img/fas fa-exclamation-triangle Copy 2@3x.png" mode=""></image>
			</view>
			<view class="text">
				故障上报
			</view>
		</view>
	</view>
</template>

<script>
	import {
		parseUnixTime,
		beforeTimeStamp,
		getWeek
	} from '@/apis/utils'
	import * as echarts from 'echarts';
	import * as API from '@/apis/pagejs/index.js'

	export default {
		data() {
			return {
				abnormalRecordsList: [], //异常list
				companyId: '', //企业id
				meterId: '', //设备id
				titleName: '',
				clickType: 0,
				sumQuantity: 0,
				equipmentInfosShow: false,
				kWhList: [],
				queryDay: '',
				showTop: [0, 0, 0, 0, 0, 0, 0, 0],
				FormData: {
					queryDate: '',
					meterId: '',
					type: 0
				},
				FormData2: {
					queryDate: '',
					meterId: ''
				},
				myChart: null,
				endYear: '',
				equipmentShow: false,
				multiSelector: [],
				equipmentList: [],
				params: {
					year: true,
					month: true,
					day: true,
					hour: false,
					minute: false,
					second: false
				},
				tabsFrom: {
					show1: false,
					show1Index: 0,
					show2Index: '',
					show2: false,
					show1Text: "全部类型",
					show2Text: "全部时间",
					selector1: [{
							label: '全部类型',
							value: '',
						},
						{
							label: '线上充值',
							value: '1',
						},
						{
							label: '线下充值',
							value: '2',
						},
					]
				},
				background: {
					backgroundColor: '#1677FF',
				},
				list: [{
					id: 4,
					name: '当日用电量',
					disabled: false
				}, {
					id: 1,
					name: '当月用电量',
					disabled: false
				}, {
					id: 2,
					name: '上月用电量',
					disabled: false
				}, {
					id: 3,
					name: '当年用电量',
					disabled: false
				}, {
					id: 0,
					name: '总用电量',
					disabled: false
				}, {
					id: 10,
					name: '指定月份',
					disabled: false
				}],
				value: '2',
				intervalId: null, // 用于存储间隔ID  
				intervalReady: true, // 用于存储间隔ID 
			};
		},
		onLoad(op) {
			if (op.id) {
				this.FormData.meterId = op.id;
				this.FormData2.meterId = op.id;
				this.tabsFrom.title = op.name;
				this.meterId = op.id;
				this.titleName = op.name;
				this.companyId = op.companyId;
			}
			this.endYear = new Date().getFullYear();
			this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
			this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
			this.FormData.type = 2;

			this.getElectricityStatistics();
			this.getTimeSlotStatistics();
			this.getCompanyInfoList();
			this.getAbnormalAlarmRecord();
		},
		beforeDestroy() {
			this.clearTimer(); // 组件销毁前清除定时器
			this.intervalReady = false;
			console.log("组件销毁前清除定时器")
		},
		methods: {
			clearTimer() {
				if (this.intervalId) {
					clearInterval(this.intervalId); // 清除定时器  
					this.intervalId = null; // 重置定时器ID  
				}
			},
			startInterval() {
				this.clearTimer(); // 组件销毁前清除定时器 
				this.intervalId = setInterval(() => {
					// 每隔5秒运行的代码  
					// console.log('这段代码每隔5秒运行一次');
					this.getElectricityStatistics(true)
					this.getTimeSlotStatistics(true)
				}, 60000);
			},
			gotoInfo(path, type, name) {
				if (!this.FormData.meterId) {
					uni.showToast({
						title: "未查询到电表",
						icon: "none"
					})

					return
				}
				uni.navigateTo({
					url: "/pages/equipmentDataMonitoring/" + path + "?id=" + this.FormData.meterId + "&type=" + type +
						"&typeName=" + name
				})

			},

			// 异常告警记录
			getAbnormalAlarmRecord() {
				var queryDate = parseUnixTime(new Date(), '{y}-{m}');

				uni.showLoading({
					title: "加载中",
					mask: true,
				})
				API.alarmRecord({
					queryDate: queryDate,
					configId: '',
					pageIndex: 1,
					pageSize: 2,
					companyId: this.companyId
				}).then((res) => {
					uni.hideLoading();
					this.abnormalRecordsList = res.data.data;
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			titleCk() {
				if (this.tabsFrom.selector1.length > 1) {
					this.tabsFrom.show1 = true
				}
			},
			selector1confirm(e) {
				console.log(e)
				// var index = e[2];
				// this.tabsFrom.show1Index = index;
				if (e[2].value != null) {
					this.tabsFrom.show1Text = e[2].label;
					this.tabsFrom.title = e[2].label;

					this.FormData.meterId = e[2].value;
					this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					this.FormData2.meterId = e[2].value;
					this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					//this.meterId =e[2].value;
					this.FormData.type = 2;
					this.value = '2';

					this.getTimeSlotStatistics();
					this.getElectricityStatistics();
				}
			},
			selector1cancel() {
				this.tabsFrom.show1Text = this.titleName;
				this.tabsFrom.title = this.titleName;

				this.FormData.meterId = this.meterId;
				this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
				this.FormData2.meterId = this.meterId;
				this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');

				this.FormData.type = 2;
				this.value = '2';

				this.getTimeSlotStatistics();
				this.getElectricityStatistics();
			},
			queryDate(queryTime, day) {

				if (day) {
					this.FormData2.queryDate = queryTime;
					//this.FormData2.type =day?"9":"10"
					//this.value="-1"

					this.getTimeSlotStatistics();
				} else {

					this.FormData.queryDate = queryTime + "-01";
					this.FormData.type = 10;
					this.value = "10";
					this.list[5].name = queryTime;

					this.getElectricityStatistics();
				}
			},
			getCompanyInfoList() {
				uni.showLoading({
					title: "加载中",
					mask: true,
				})
				API.deviceCompanyList().then((response) => {
					uni.hideLoading();
					var list = response.data.companyInfoList;
					this.tabsFrom.selector1 = [];
					this.tabsFrom.selector1 = list.map(item => {
						if (item.remoteReadingMeterList.length != 0 && item.remoteMonitorMeterList.length != 0) {
							return {
								label: item.fullName,
								value: item.id,
								children: [{
										label: '抄表',
										value: '1',
										children: item.remoteReadingMeterList.map(item => {
											return {
												label: item.name,
												value: item.id,
											}
										})
									},
									{
										label: '监控表',
										value: '1',
										children: item.remoteMonitorMeterList.map(item => {
											return {
												label: item.name,
												value: item.id,
											}
										})
									}
								]
							}
						} else if (item.remoteReadingMeterList.length != 0 && item.remoteMonitorMeterList.length == 0) {
							return {
								label: item.fullName,
								value: item.id,
								children: [{
									label: '抄表',
									value: '1',
									children: item.remoteReadingMeterList.map(item => {
										return {
											label: item.name,
											value: item.id,
										}
									})
								}]
							}
						} else if (item.remoteReadingMeterList.length == 0 && item.remoteMonitorMeterList.length != 0) {
							return {
								label: item.fullName,
								value: item.id,
								children: [{
									label: '监控表',
									value: '1',
									children: item.remoteMonitorMeterList.map(item => {
										return {
											label: item.name,
											value: item.id,
										}
									})
								}]
							}
						} else {

						}
					})
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getTimeSlotStatistics(interval) {
				if (!interval) {
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}

				this.queryDay = parseUnixTime(new Date(this.FormData2.queryDate), '{y}年{m}月{d}日');
				API.timeSlotStatistics(this.FormData2).then((response) => {
					if (!interval) {
						uni.hideLoading();
					}
					this.hourMap = response.data.hourMap;
					this.sumQuantity = response.data.allKwh;
					this.getBarCharts(this.hourMap, interval);

					if (!interval) {
						this.startInterval(); // 组件挂载后开始间隔  
					}
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getElectricityStatistics(interval) {
				if (!interval) {
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}
				var obj = {
					...this.FormData
				}
				// if(obj.type==10){
				// 	obj.queryDate+="-01"
				// }
				API.electricityStatistics(obj).then((response) => {
					if (!interval) {
						uni.hideLoading();
					}
					this.showTop = [0, 0, 0, 0, 0, 0, 0, 0]
					var electricity = response.data.kwhMap.kwh + "";

					if (electricity) {
						var sz = electricity.split(".")
						var str1 = sz[0];
						var str2 = [];
						if (sz.length > 1) {
							str2 = sz[1];
							this.showTop[7] = str2[0];
						}
						var j = 0;
						for (var i in str1) {
							if (i != undefined) {
								this.showTop[6 - str1.length + j + 1] = str1[i]
							}
							j++;
						}
						this.$forceUpdate()
					}

					if (!interval) {
						this.startInterval(); // 组件挂载后开始间隔  
					}
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getBarCharts(list, interval) {
				if (!this.myChart) {
					this.myChart = echarts.init(document.getElementById('barEcharts'), null, {
						width: uni.upx2px(700),
						height: uni.upx2px(480)
					});
				}
				if (!interval) {
					this.myChart.clear();
				}

				var data1 = [];
				var data2 = [];
				// var sumQuantity=0
				for (var i in list) {
					data1.push(i)
					data2.push(list[i].kwh)
					// sumQuantity+=list[i]

				}
				var axisLabel = {
					rotate: 40,
					interval: 0,
					textStyle: {
						color: "#333"
					}
				}

				if (data1.length < 8) {
					axisLabel = {

						interval: 0,
						textStyle: {
							color: "#333"
						},
					}
				}

				// this.sumQuantity = sumQuantity.toFixed(2);
				var headitemby = "";
				var showkey = "";
				var option = {
					tooltip: {
						trigger: 'axis',
						axisPointer: {
							type: 'shadow'
						},
						formatter: (value) => {
							var dataIndex = value[0].dataIndex;
							var name2 = ''
							if (dataIndex + 1 == data1.length) {
								name2 = "24:00"
							} else {
								name2 = data1[dataIndex + 1];
							}
							var name = value[0].name;
							var obj = this.hourMap[name]
							var text = `<p>${name}</p>`
							
							if (data1.length < 8) {
								text = `<p>${name}-${name2}</p>`
							}
							if (obj.electricityPrice != undefined) {
								text += `<p>电价：${obj.electricityPrice}元/度</p>`
							}
							if (obj.kwh != undefined) {
								text += `用电量：${obj.kwh}度`
							}
							if (obj.amount != undefined) {
								text += ` <p>电费：${obj.amount}元</p>`
							}
							return text

						}
					},
					grid: {
						top: '6%',
						left: '3%',
						right: '8%',
						bottom: '8%',
						containLabel: true
					},
					xAxis: {
						type: 'category',
						data: data1,

						axisLabel: axisLabel,
					},
					yAxis: {
						type: 'value',

					},
					series: [{
						name: '合计',
						data: data2,
						type: 'bar',
						label: {
							show: true,
							position: 'top',
							color: '#5C7BD9'
						}
					}]
				}
				console.log(option)
				this.myChart.setOption(option);
			},
			selector2confirm(e) {
				this.tabsFrom.show2Text = e.year + "年" + e.month + "月"

				this.tabsFrom.show2Index = e.year + "-" + e.month
				if (e.day) {
					this.tabsFrom.show2Text += e.day + "日"
					this.tabsFrom.show2Index += '-' + e.day

					this.queryDate(this.tabsFrom.show2Index, true)
				} else {
					this.queryDate(this.tabsFrom.show2Index, false)
				}
			},
			selector2cancel() {
				this.value = this.clickType;
			},
			selector2reset(e) {
				console.log(e)
				this.tabsFrom.show2Text = '全部时间'
				this.tabsFrom.show2Index = '';

				if (e.day) {
					this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					this.queryDay = parseUnixTime(new Date(this.FormData2.queryDate), '{y}年{m}月{d}日');
					this.getTimeSlotStatistics();
				} else {
					this.FormData.type = this.clickType;
					this.value = this.clickType;
					if (this.value != 10) {
						this.list[5].name = '指定月份';
					}
					this.getElectricityStatistics();
				}
			},
			// 选中某个单选框时，由radio时触发
			radioChange(e) {
				console.log(`选择前的值: ${this.value}`);
				this.clickType = this.value;
			},
			// 选中任一radio时，由radio-group触发
			radioGroupChange(e) {
				console.log(e)
				this.FormData.type = e;
				if (e == 10) {
					this.tabsFrom.show2 = true;
					this.params.day = false;
				} else {
					this.list[5].name = '指定月份'
					this.getElectricityStatistics();
				}
			},
			backDataMonitoringList() {
				uni.navigateBack()
			},
		}
	};
</script>


<style lang="scss" scoped>
	page {
		padding-bottom: 184rpx;
	}

	/deep/.u-select__header__title {
		font-size: 36rpx;
		font-weight: bold;
	}

	.navbar-c {
		background-color: rgba(22, 119, 255, 1);
		position: fixed;
		top: 0;
		left: 0;
		right: 0;
		z-index: 999;

		.back {
			z-index: 999;
			width: 200rpx;
		}

		.title {
			color: #fff;
			display: flex;
			align-items: center;
			justify-content: center;
		}

		.right {
			.img {
				width: 48rpx;
				height: 48rpx;
			}
		}
	}

	/deep/.uicon-nav-back {
		color: #fff !important;

	}

	.background {
		background-color: rgba(22, 119, 255, 1);
		padding-top: 88rpx;
		padding-bottom: 100rpx;


		/deep/.u-border-bottom:after {
			border: none;
		}

		.u-nav-slot {
			margin-right: 32rpx;

			.img {
				width: 48rpx;
				height: 48rpx;
				vertical-align: middle;
			}
		}


	}


	.background::after {
		content: '';
		position: absolute;
		width: 160%;
		height: 80px;
		background-color: rgba(22, 119, 255, 1);
		left: -30%;
		border-radius: 0 0 50% 50%;

	}

	// // 日期
	.date-box {
		display: flex;
		align-items: center;
		justify-content: space-between;
		margin: 24rpx 32rpx;


		.item {
			border-radius: 8px;
			background-color: rgba(255, 255, 255, 0.1);
			border: 1px solid rgba(255, 255, 255, 0.15);
			width: 120rpx;
			height: 120rpx;
			color: #fff;
			text-align: center;
			display: flex;
			flex-direction: column;
			justify-content: center;

			.date {
				font-size: 40rpx;


			}

		}

		.item-today {
			background-color: rgba(255, 255, 255, 1);
			position: relative;

			.date {
				color: rgba(22, 119, 255, 1);
			}

			.week {
				color: rgba(16, 16, 16, 1);
			}

			.dot {
				width: 10rpx;
				height: 10rpx;
				background-color: rgba(255, 150, 0, 1);
				border-radius: 999px;
				position: absolute;
				bottom: -5rpx;
				left: 50%;
				transform: translateX(-50%);
			}
		}
	}

	// 用电量
	.electricity-consumption {
		background-color: #fff;
		padding: 40rpx 32rpx 0rpx;
		border-radius: 8px;
		margin: -88rpx 32rpx 0;
		position: relative;

		.title {
			color: rgba(16, 16, 16, 1);
			font-size: 36rpx;

		}

		.degree {
			display: flex;
			margin-top: 32rpx;

			.item {
				margin-right: 6rpx;
				text-align: center;

				.item-text {
					color: rgba(16, 16, 16, 1);
				}

				.item-number {
					margin-top: 24rpx;
					width: 72rpx;
					height: 96rpx;
					background-color: rgba(16, 16, 16, 1);
					color: #fff;
					font-size: 72rpx;

				}

				.decimal {
					background-color: #900005;
				}
			}
		}


		// .tab {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #fff;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 0rpx;
		// 	right: 0rpx;
		// 	color: #101010;
		// 	color: rgba(16, 16, 16, 1);
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	z-index: 999;
		// 	text-indent: 16rpx;
		// }

		// .tab2 {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #D4DBE4;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 210rpx;
		// 	right: 0rpx;
		// 	color: #777777;
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	text-indent: 16rpx;
		// }

		.radio {
			margin-top: 24rpx;

			/deep/.u-radio__label {
				font-size: 24rpx
			}

			/deep/.u-radio {
				margin-bottom: 16px;
				width: 200rpx !important;
			}

		}
	}

	//各时段用电量
	.electricity-chart {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			// justify-content: space-between;
			padding: 0 12rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {

				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}

			.more {
				margin-left: auto;
			}
		}

		.chart {
			width: 100%;
			height: 500rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}
	}

	.equipment-information {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			padding: 0 32rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				display: flex;
				align-items: center;
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}

			.date {
				margin-left: auto;
			}

			.more {
				color: #838383;
				font-size: 24rpx;
				margin-left: auto;

			}
		}

		.chart {
			width: 100%;
			height: 440rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}

		.infos {
			padding: 0 32rpx;
			display: flex;
			justify-content: space-between;
			text-align: center;

			.border {
				margin: auto 0;
				height: 70rpx;
				width: 2rpx;
				background-color: rgba(204, 204, 204, 1);
				;
			}

			.item-title {
				color: rgba(119, 119, 119, 1);
			}

			.item-value {
				color: rgba(16, 16, 16, 1);
				font-size: 32rpx;
				margin-top: 16rpx;
			}

		}
	}

	// 异常
	.abnormal {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.headline {
			display: flex;
			align-items: center;
			justify-content: space-between;
		}

		.title {
			display: flex;
			align-items: center;
			font-weight: bold;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.more {
			color: #838383;
			font-size: 24rpx
		}

		.details {
			margin-top: 40rpx;

			.item {
				display: flex;
				align-items: center;
				justify-content: space-between;
				margin-top: 32rpx;

				.name {
					color: rgba(51, 51, 51, 1);
				}

				.time {
					color: rgba(119, 119, 119, 1);
					font-size: 24rpx;
				}
			}
		}

	}

	// 能源监测
	.energy-inspection,
	.data-analysis {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			font-weight: bold;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.grid {
			.icon {
				width: 128rpx;
				height: 128rpx;
				border-radius: 12px;
				background-color: rgba(35, 186, 178, 1);
				display: flex;
				align-items: center;
				justify-content: center;
				margin-bottom: 16rpx;

				.img {
					width: 80rpx;
					height: 80rpx;
				}
			}

			.icon2 {
				background-color: rgba(42, 186, 72, 1);
			}

			.icon3 {
				background-color: rgba(78, 96, 246, 1);
			}

			.icon4 {
				background-color: rgba(22, 119, 255, 1);
			}

			.icon5 {
				background-color: rgba(35, 186, 178, 1);
			}

			.icon6 {
				background-color: rgba(42, 186, 72, 1);
			}

			.icon7 {
				background-color: rgba(22, 119, 255, 1);
			}

			.icon8 {
				background-color: rgba(35, 186, 178, 1);
			}

			.icon9 {
				background-color: rgba(42, 186, 72, 1);
			}

			.grid-text {
				color: #333333;
			}
		}
	}


	// 设备信息弹窗
	.equipment-popup {

		.content {

			padding: 32rpx;

			.headline {
				color: rgba(16, 16, 16, 1);
				font-size: 36rpx;
				text-align: center;
				font-weight: bold;
			}

			.infos {
				padding-bottom: 100rpx;

				.item:last-of-type {
					border: none;
				}

				.item {
					display: flex;
					align-items: center;
					height: 80rpx;
					line-height: 80rpx;
					border-bottom: 1px solid #cccccc;

					.item-title {
						color: rgba(51, 51, 51, 1);
						width: 200rpx;
					}

					.item-value {
						color: #666666;
						flex: 1;
						margin-left: 16rpx;
					}
				}

			}

			.get {
				height: 80rpx;
				line-height: 80rpx;
				border-radius: 4px;
				background-color: rgba(22, 119, 255, 1);
				color: rgba(255, 255, 255, 1);
				font-size: 32rpx;
			}
		}
	}




	// 创建工单
	.create-order {
		width: 120rpx;
		height: 120rpx;
		border-radius: 20px;
		background: linear-gradient(180.29deg, rgba(255, 124, 112, 1) 0.9%, rgba(255, 79, 63, 1) 100.4%);
		box-shadow: 0px 2px 6px 0px rgba(0, 0, 0, 0.4);
		text-align: center;
		display: flex;
		flex-direction: column;
		justify-content: center;
		align-items: center;
		position: fixed;
		right: 32rpx;
		bottom: 64rpx;

		.img {
			width: 56rpx;
			height: 56rpx;
			vertical-align: middle;
		}

		.text {
			color: rgba(255, 255, 255, 1);
			font-size: 22rpx;
		}
	}
</style>