<template>
	<view>

		<view class="background">
			<u-picker  v-model="tabsFrom.show1"
			 :defaultSelector="[tabsFrom.show1Index]"
			 mode="selector" :range="tabsFrom.selector1"  range-key="label" @confirm="selector1confirm" ></u-picker>
			
			<u-picker-select title="日期选择" v-model="tabsFrom.show2"
			 :defaultTime="tabsFrom.show2Index" :endYear="endYear" @cancel="selector2cancel"
			 mode="time"  :params="params" :noselect="false"  @confirm="selector2confirm" @reset="selector2reset" ></u-picker-select>
			
			<u-navbar :background="background"
			@titleCk="titleCk" :title-icon="electricityMeterList.length>1?'arrow-down':''"
			 back-icon-color="#fff" :title="title" title-color="#fff">
				
			
				
			<!-- 	<view class="u-nav-slot" slot="right" @click="tabsFrom.show2=true,params.day=true">
					<image class="img" src="@/assets/img/riLine-calendar-todo-line 1.svg" mode=""></image>
				</view> -->
			</u-navbar>
			
			<!-- 日期 -->
			<view class="date-box" v-if="false" >
				
				<view class="item" v-for="(item,i) in topDate" 
				:class="{
					'item-today':item.queryDate==FormData.queryDate
				}"
				@click="queryDate(item.queryDate,true)"
				:key="i">
					<view class="date">
						{{item.num}}
					</view>
					<view class="week">
						{{item.week}}
					</view>
					<view class="dot" v-if="item.today==0">
						
					</view>
					
				</view>
				<view class="item item-today" v-if="0">
					<view class="date">
						26
					</view>
					<view class="week ">
						今天
					</view>
					<view class="dot">
						
					</view>
				</view>
			</view>

		</view>
		<!-- 用电量 -->
		<view class="electricity-consumption">
			<view class="title">
				<view class="titleUnit">用电量统计(kW·h)</view>
				<view class="titleElectricity" v-if="electricity.id">
					<span class="spanradius" :class="{
						normal:electricity.online
					}" ></span>
				{{electricity.online?'电表在线':'电表离线'}}</view>
			</view>
			<view class="degree">
				<view class="item">
					<view class="item-text">
						佰万
					</view>
					<view class="item-number" v-text="showTop[0]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾万
					</view>
					<view class="item-number" v-text="showTop[1]" >
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						万
					</view>
					<view class="item-number" v-text="showTop[2]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						仟
					</view>
					<view class="item-number" v-text="showTop[3]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						佰
					</view>
					<view class="item-number" v-text="showTop[4]">
						0
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						拾
					</view>
					<view class="item-number" v-text="showTop[5]">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						1
					</view>
					<view class="item-number" v-text="showTop[6]">
						7
					</view>
				</view>
				<view class="item">
					<view class="item-text">
						0.1
					</view>
					<view class="item-number decimal" v-text="showTop[7]">
						7
					</view>
				</view>
			</view>
			
			<view class="radio">
				<u-radio-group v-model="value" @change="radioGroupChange">
					<u-radio @change="radioChange" v-for="(item, index) in list" :key="index" :name="item.id"
						:disabled="item.disabled">
						{{item.name}}
					</u-radio>
				</u-radio-group>
			</view>
		</view>
		<!-- 各时段用电量 -->
		<view class="electricity-chart">
			<view class="title">
				
				<view class="text">
					<view class="icon-title">
					
					</view>	各时段用电量 (度)

				</view>
				<view @click="tabsFrom.show2=true,params.day=true" class="queryDayClass" >
					{{queryDay}}<u-icon name="arrow-down"></u-icon>
				</view>
			</view>
			<view class="chart">
				<view id="pieEcharts" >
				
				</view>
				<view   
				style="background: white;    display: flex;justify-content: space-between;padding: 0 12px;" >
					<view>电量合计：{{sumQuantity}}度</view>
					<view>电费合计：{{sumFee}}元</view>
				</view>
				
			</view>
		</view>
		
		
		<!-- 设备信息 -->
		<view class="equipment-information">
			<view class="title">
		
				<view class="icon-title">
		
				</view>
				<view class="text">
					设备信息
		
				</view>
				<view class="more" @click="equipmentInfosShow=true">
					查看全部<u-icon name="arrow-right" size="24" color="#d4d4d4"></u-icon>
				</view>
			</view>
		
			<view class="infos">
				<view class="item" style="width: 30%;">
					<view class="item-title">
						设备类型
					</view>
					<view class="item-value">
						{{meterDetail.deviceTypeN}}
					</view>
				</view>
				<view class="border">
		
				</view>
				<view class="item" style="width: 30%;">
					<view class="item-title">
						设备编号
					</view>
					<view class="item-value">
						{{meterDetail.deviceNo}}
					</view>
				</view>
				<view class="border">
		
				</view>
				<view class="item" style="width: 30%;">
					<view class="item-title">
						设备地址
					</view>
					<view class="item-value">
						{{meterDetail.installationAddressSimple}}
					</view>
				</view>
			</view>
		</view>
		<!-- 设备信息弹窗 -->
		
		<view class="equipment-popup">
			<u-popup v-model="equipmentInfosShow" mode="bottom" border-radius="12">
				<view class="content">
					<view class="headline">
						设备信息
					</view>
					<view class="infos">
						<view class="item">
							<view class="item-title">
								设备名称
							</view>
							<view class="item-value">
								{{meterDetail.name}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								设备类型
							</view>
							<view class="item-value">
								{{meterDetail.deviceTypeN}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								设备编号
							</view>
							<view class="item-value">
								{{meterDetail.deviceNo}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								产权单位
							</view>
							<view class="item-value">
								{{meterDetail.companyFullName}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								设备地址
							</view>
							<view class="item-value">
								<span>{{meterDetail.installationAddress}}</span>
								<image class="img" v-if="false" src="@/assets/img/riFill-navigation-fill 1.svg"></image>
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								地址简称
							</view>
							<view class="item-value">
								<span>{{meterDetail.installationAddressSimple}}</span>
								<image class="img" v-if="false" src="@/assets/img/riFill-navigation-fill 1.svg"></image>
							</view>
						</view>
						
						<view class="item">
							<view class="item-title">
								使用单位
							</view>
							<view class="item-value">
								{{meterDetail.customer}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								上线时间
							</view>
							<view class="item-value">
								{{meterDetail.enablingTime}}
							</view>
						</view>
					
					</view>
					<button class="get" @click="equipmentInfosShow=false">知道了</button>
				</view>
			</u-popup>
		
		</view>
		
		
	</view>
</template>

<script>
	import {
		parseUnixTime,
		beforeTimeStamp,
		getWeek,newDate
	} from '@/apis/utils'
	import * as API from '@/apis/pagejs/tenantElectricityMeter.js'
	import * as echarts from "echarts";
	
	export default {
		data() {
			return {
				queryDay:'',
				title:"查询中",
					myChart:null,
				showTop: [0, 0, 0, 0, 0, 0, 0, 0],
				topDate:[],
				electricityMeterList:[],
				FormData:{
					
				},
				FormData2:{
					
				},
				endYear:'',
				params: {
					year: true,
					month: true,
					day: true,
					hour: false,
					minute: false,
					second: false
				},
				tabsFrom: {
					show1: false,
					show1Index:0,
					show2Index:'',
					show2: false,
					show1Text: "全部类型",
					show2Text: "全部时间",
					selector1:[
						{
								label: '全部类型',
								value: '',
							},
						{
								label: '线上充值',
								value: '1',
							},
							{
								label: '线下充值',
								value: '2',
							},
					]
				},
				background: {
					backgroundColor: '#1677FF',
				},
				list: [
					{
						id:1,
						name: '本月用电量',
						disabled: false
					},
					{
						id:4,
						name: '今日用电量',
						disabled: false
					},
					{
						id:2,
						name: '上月用电量',
						disabled: false
					},
					
					 {
						id:3,
						name: '本年用电量',
						disabled: false
					}, {
						id:0,
						name: '合计用电量',
						disabled: false
					}, {
						id:10,
						name: '指定月份',
						disabled: false
					}
				],
				sumQuantity:0,
				sumFee:0,
			 
				// u-radio-group的v-model绑定的值如果设置为某个radio的name，就会被默认选中
				value: '2',
				oldvalue: '2',
				intervalId: null, // 用于存储间隔ID  
				intervalReady: true, // 用于存储间隔ID  
				electricity:{
					
				},
				meterDetail:{
					
				},
				equipmentInfosShow:false,
			};
		},
		onLoad() {
			this.endYear=new Date().getFullYear()
			this.FormData.queryDate=parseUnixTime(new Date(), '{y}-{m}-{d}')
			this.FormData2.queryDate=parseUnixTime(new Date(), '{y}-{m}-{d}')
			
			this.FormData.type=2
			this.getElectricityMeterList();
			
			// for(var i =4;i>=0;i--){
			// 	var time=new Date(beforeTimeStamp(i,new Date()));
			// 	 this.topDate.push({
			// 		 num:time.getDate(),
			// 		 week:i==0?'今日':getWeek(time),
			// 		 today:i,
			// 		 queryDate:parseUnixTime(time, '{y}-{m}-{d}')
			// 	 })
			// }
			
			// console.log( this.topDate)
		},
		 beforeDestroy() {  
		    this.clearTimer(); // 组件销毁前清除定时器  
			this.intervalReady=false;
			 console.log( "组件销毁前清除定时器")
		  }, 
		methods: {
			 clearTimer() {  
			      if (this.intervalId) {  
			        clearInterval(this.intervalId); // 清除定时器  
			        this.intervalId = null; // 重置定时器ID  
			      }  
			    },
			startInterval(){
				 this.clearTimer(); // 组件销毁前清除定时器 
				  this.intervalId = setInterval(() => {  
				         // 每隔5秒运行的代码  
				         console.log('这段代码每隔5秒运行一次'); 
						 this.getTimeSlotStatistics(true)
						  this.getElectricityStatistics(true)
				 }, 60*1000);  
			},
			titleCk(){
				if(this.electricityMeterList.length>1){
					this.tabsFrom.show1=true
				}
			},
			
			selector1confirm(e){
				
				var index=e[0]
				this.tabsFrom.show1Index=index
				this.tabsFrom.show1Text=this.tabsFrom.selector1[index].label
				this.title=this.tabsFrom.selector1[index].label
				
				this.FormData.meterId=this.tabsFrom.selector1[index].value
				this.FormData.queryDate=parseUnixTime(new Date(), '{y}-{m}-{d}')
				this.FormData2.meterId=this.tabsFrom.selector1[index].value
				this.FormData2.queryDate=parseUnixTime(new Date(), '{y}-{m}-{d}')
				
				this.FormData.type=2
				this.value="2"
				this.electricity=this.electricityMeterList[index]
					
				this.getMeterDetails()
				this.getTimeSlotStatistics()
				this.getElectricityStatistics()
				
				
			},
			
			queryDate(queryTime,day){
				
				if(day){
					this.FormData2.queryDate=queryTime;
					//this.FormData2.type =day?"9":"10"
					//this.value="-1"
					
					this.getTimeSlotStatistics()
					
				}else{
					
					this.FormData.queryDate=queryTime+"-01";
					this.FormData.type ="10"
					//this.value="-1"
					
					this.getElectricityStatistics()
					
				}
				
				
			},
			getElectricityStatistics(interval){
				// if(!this.intervalReady){
				// 	return
				// }
				if(!interval){
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}
				
				var obj={
					...this.FormData
				}		
					// if(obj.type==10){
					// 	obj.queryDate+="-01"
					// }
							
				API.electricityStatistics(obj).then((response) => {
					if(!interval){
						uni.hideLoading();
					}
					this.showTop = [0, 0, 0, 0, 0, 0, 0, 0]
					var electricity = response.data.kwhMap.kwh+"";
					
					if (electricity) {
						var sz = electricity.split(".")
						var str1 = sz[0];
						var str2 = [];
						if (sz.length > 1) {
							str2 = sz[1];
							this.showTop[7] = str2[0];
						}
						var j = 0;
						for (var i in str1) {
							if (i != undefined) {
								this.showTop[6 - str1.length + j + 1] = str1[i]
							}
							j++;
						}
						this.$forceUpdate()
					}
					//this.electricityMeterList=response.data.meterList
					if(!interval){
						this.startInterval(); // 组件挂载后开始间隔  
					}
					 
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getMeterDetails(){
				
				API.meterDetails({
					meterId:this.FormData.meterId
				}).then((response) => {
					this.meterDetail=response.data.meter;
					
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getTimeSlotStatistics(interval){
				
				if(!interval){
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}
				this.queryDay=parseUnixTime(newDate(this.FormData2.queryDate), '{y}年{m}月{d}日');
							
				API.timeSlotStatistics(this.FormData2).then((response) => {
					
					if(!interval){
						uni.hideLoading();
					}
					this.hourMap=response.data.hourMap
					this.sumQuantity=response.data.kwhMap.kwh
					this.sumFee=response.data.kwhMap.fee
					
					
					this.getPle(this.hourMap,interval)
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getPle(list,interval){
				
				if (!this.myChart) {
					this.myChart = echarts.init(document.getElementById('pieEcharts'),null,{
						width:uni.upx2px(700),height:uni.upx2px(480)
					});
				}
				if(!interval){
					this.myChart.clear();
				}
				
				var data1=[];
				var data2=[];
				
				for(var i in list){
					data1.push(i)
					data2.push(list[i].kwh)
					
					
				}
				var axisLabel={
					rotate:40,
					interval:0,
					textStyle: {
						color: "#333"
					}
				}
				
				if(data1.length<8){
					
					axisLabel={
					
					interval:0,
					textStyle: {
						color: "#333"
					},
					}
				}
				
				var headitemby=""
				var showkey = "";
				var option = {
					 tooltip: {
					    trigger: 'axis',
						 formatter: (value) => {
							
							 var name = value[0].name;
							 var obj=list[name]
							 var text= `<p>${name}</p>`
							
							if(obj.electricityPrice!=undefined){
								text+=`<p>电价：${obj.electricityPrice}元/度</p>`
							}
							if(obj.kwh!=undefined){
								text+=`<p>电量：${obj.kwh}度</p>`
							}
							if(obj.amount!=undefined){
								text+=` <p>电费：${obj.amount}元</p>`
							}
							 return text
							
						 }
					  },
					grid: {
						top: 20,
						left: 0,
						right: 10,
						bottom: 20,
						containLabel: true
					},
					  xAxis: {
					    type: 'category',
					    data: data1,
						
						axisLabel: axisLabel,
					  },
					  yAxis: {
					    type: 'value',
					  },
					  series: [
					    {
						  name: '电量',
					      data: data2,
					      type: 'bar',
						  label: {
						  	show: true,
						  	position: 'top',
						  	color: '#5C7BD9'
						  }
					    }
					  ]
				}
				console.log(option)
				this.myChart.setOption(option);
				
				
			},
			getElectricityMeterList(){
				uni.showLoading({
					title: "加载中",
					mask: true,
				})
							
				
							
				API.electricityMeterList().then((response) => {
					uni.hideLoading();
					this.electricityMeterList=response.data.meterList
					if(this.electricityMeterList.length){
						this.electricity=this.electricityMeterList[0];
							
						this.FormData.meterId=this.electricityMeterList[0].id
						this.FormData2.meterId=this.electricityMeterList[0].id
					
						this.title=this.electricityMeterList[0].name
						// {
						// 		label: '全部类型',
						// 		value: '',
						// 	}
						this.tabsFrom.selector1=[]
						this.tabsFrom.selector1=this.electricityMeterList.map(item=>{
							return {
								label:item.name,
								value:item.id
							}
						})
						this.getMeterDetails();
						this.getTimeSlotStatistics()
						this.getElectricityStatistics()
					}else{
						uni.showModal({
							title:"提示",
							content:"未绑定电表,请联系管理员！",
							showCancel:false,
							success() {
								uni.navigateBack()
							}
						})
					}
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			selector2confirm(e){
				this.tabsFrom.show2Text=e.year+"年"+e.month+"月"
				
				this.tabsFrom.show2Index=e.year+"-"+e.month
				if(e.day){
					this.tabsFrom.show2Text+=e.day+"日"
					this.tabsFrom.show2Index+='-'+e.day	
					
					this.queryDate(this.tabsFrom.show2Index,true)
				}else{
					this.queryDate(this.tabsFrom.show2Index,false)
				}
				
			},
			selector2reset(e){
				console.log(e)
				this.tabsFrom.show2Text='全部时间'
				this.tabsFrom.show2Index='';
				if(this.params.day){
					this.FormData2.queryDate=parseUnixTime(new Date(), '{y}-{m}-{d}')
					this.getTimeSlotStatistics()
				}else{
					
					this.selector2cancel()
				}
				
				
			},
			// 选中某个单选框时，由radio时触发
			radioChange(e) {
				 //console.log(e);
			},
			// 选中任一radio时，由radio-group触发
			selector2cancel(){
				this.value=this.oldvalue;
			},
			radioGroupChange(e) {
				 console.log(e);
				 
				 this.FormData.type=e
				 if(e==10){
					 this.tabsFrom.show2=true
					 this.params.day=false
				 }else{
					 this.oldvalue= this.FormData.type;
					 this.getElectricityStatistics()
				 }
			}
		}
	};
</script>


<style lang="scss" scoped>
	page {
		padding-bottom: 100rpx;
	}

	.background {
		background-color: rgba(22, 119, 255, 1);
		padding-bottom: 100rpx;



		/deep/.u-border-bottom:after {
			border: none;
		}

		.u-nav-slot {
			margin-right: 32rpx;

			.img {
				width: 48rpx;
				height: 48rpx;
				vertical-align: middle;
			}
		}


	}


	.background::after {
		content: '';
		position: absolute;
		width: 160%;
		height: 80px;
		background-color: rgba(22, 119, 255, 1);
		left: -30%;
		border-radius: 0 0 50% 50%;

	}

	// // 日期
	.date-box {
		display: flex;
		align-items: center;
		justify-content: space-between;
		margin: 24rpx 32rpx;


		.item {
			border-radius: 8px;
			background-color: rgba(255, 255, 255, 0.1);
			border: 1px solid rgba(255, 255, 255, 0.15);
			width: 120rpx;
			height: 120rpx;
			color: #fff;
			text-align: center;
			display: flex;
			flex-direction: column;
			justify-content: center;
			    align-items: center;
			.date {
				font-size: 40rpx;


			}
			.dot{
				width: 10rpx;
				height: 10rpx;
				background-color: rgba(255,150,0,1);
				border-radius: 999px;
				
				bottom: -5rpx;
				left: 50%;
				transform: translateX(-50%);
			}
		}

		.item-today {
			background-color: rgba(255, 255, 255, 1);
            position: relative;
			.date {
				color: rgba(22, 119, 255, 1);
			}

			.week {
				color: rgba(16, 16, 16, 1);
			}
			
		}
		
	}
	

	// 用电量
	.electricity-consumption {
		background-color: #fff;
		padding: 40rpx 32rpx 0rpx;
		border-radius: 8px;
		margin: -88rpx 32rpx 0;
		position: relative;
        .title{
			display: flex;
			 justify-content: space-between;
			.titleUnit{
				color: rgba(16,16,16,1);
				font-size: 36rpx;
			}
			.titleElectricity{
				color:#333333 100%;
				font-size: 28rpx;
				.spanradius{
					width: 20rpx;
					height: 20rpx;
					background-color: #FF7B00  ;
					color: #FF7B00  ;
					margin-right: 4rpx;
					 border-radius: 50%; /* 将正方形变成圆形 */
					  display: inline-block; 
				}
				.normal{
					background-color: #00B962 ;
					color: #00B962 ;
				}
				
			}
		}
		.degree{
			display: flex;
			margin-top: 32rpx;
			.item{
				margin-right: 6rpx;
				text-align: center;
				.item-text{
					color: rgba(16,16,16,1);
				}
				.item-number{
					margin-top: 24rpx;
					width: 72rpx;
					height: 96rpx;
					background-color: rgba(16,16,16,1);
					color: #fff;
					font-size: 72rpx;
					
				}
				.decimal{
					background-color: #900005;
				}
			}
		}
		

		// .tab {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #fff;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 0rpx;
		// 	right: 0rpx;
		// 	color: #101010;
		// 	color: rgba(16, 16, 16, 1);
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	z-index: 999;
		// 	text-indent: 16rpx;
		// }

		// .tab2 {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #D4DBE4;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 210rpx;
		// 	right: 0rpx;
		// 	color: #777777;
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	text-indent: 16rpx;
		// }

		.radio {
			margin-top: 24rpx;

			/deep/.u-radio__label {
				font-size: 24rpx;
				margin-right:0;
			}

			/deep/.u-radio {
				margin-bottom: 16px;
				width: 200rpx !important;
			}

		}
	}

	//各时段用电量
	.electricity-chart {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			justify-content: space-between;
			padding: 0 12rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(22, 119, 255, 1);
				border: 6px solid rgba(182, 212, 255, 1);
				border-radius: 100px;
			}

			.text {
				display: flex;
				align-items: center;
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
			.queryDayClass{
				border: 1px solid #999;
				border-radius: 3px;
				padding: 4rpx 8rpx;
			}
		}

		.chart {
			width: 100%;
			//height: 440rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}
	}
	// 设备信息弹窗
	.equipment-popup {
	
		.content {
	
			padding: 32rpx;
	
			.headline {
				color: rgba(16, 16, 16, 1);
				font-size: 36rpx;
				text-align: center;
				font-weight: bold;
				margin-bottom: 24rpx;
			}
	
			.infos {
				padding-bottom: 100rpx;
	
				.item:last-of-type {
					border: none;
				}
	
				.item {
					display: flex;
					align-items: center;
	
					line-height: 48rpx;
					padding: 24rpx 0;
					border-bottom: 1px solid #cccccc;
	
					.item-title {
						color: rgba(51, 51, 51, 1);
						width: 200rpx;
					}
	
					.item-value {
						color: #666666;
						flex: 1;
						margin-left: 16rpx;
						display: flex;
						align-items: center;
						justify-content: space-between;
						
						.img{
							width: 32rpx;
							height: 32rpx;
							transform: rotate(90deg);
							margin-left: 96rpx;
						}
					}
				}
	
			}
	
			.get {
				height: 80rpx;
				line-height: 80rpx;
				border-radius: 4px;
				background-color: rgba(22, 119, 255, 1);
				color: rgba(255, 255, 255, 1);
				font-size: 32rpx;
			}
		}
	}
	// 异常
	.abnormal {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.headline {
			display: flex;
			align-items: center;
			justify-content: space-between;
		}

		.title {
			display: flex;
			align-items: center;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(22, 119, 255, 1);
				border: 6px solid rgba(182, 212, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.more {
			color: #838383;
			font-size: 24rpx
		}

		.details {
			margin-top: 40rpx;

			.item {
				display: flex;
				align-items: center;
				justify-content: space-between;
				margin-top: 32rpx;

				.name {
					color: rgba(51, 51, 51, 1);
				}

				.time {
					color: rgba(119, 119, 119, 1);
					font-size: 24rpx;
				}
			}
		}

	}

	// 能源监测
	.energy-inspection,.data-analysis {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;

			

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.grid {
			.icon {
				width: 128rpx;
				height: 128rpx;
				border-radius: 12px;
				background-color: rgba(35, 186, 178, 1);
				display: flex;
				align-items: center;
				justify-content: center;
				margin-bottom: 16rpx;

				.img {
					width: 80rpx;
					height: 80rpx;
				}
			}
			.icon2{
				background-color: rgba(42,186,72,1);
			}
			.icon3{
				background-color: rgba(78,96,246,1);
			}
			.icon4{
				background-color: rgba(22,119,255,1);
			}
			.icon5{
				background-color: rgba(35,186,178,1);
			}
			.icon6{
				background-color: rgba(42,186,72,1);
			}
			.icon7{
				background-color: rgba(22,119,255,1);
			}
			.icon8{
				background-color: rgba(35,186,178,1);
			}

			.grid-text {
				color: #333333;
			}
		}
	}
	.icon-title{
		width: 36rpx;
		height: 36rpx;
		background-color: rgba(182, 212, 255, 1);
		border: 6px solid rgba(22, 119, 255, 1);
		border-radius: 100px;
	}
	.equipment-information {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;
	
		.title {
			display: flex;
			align-items: center;
			padding: 0 32rpx;
			margin-bottom: 40rpx;
	
			
	
			.text {
				display: flex;
				align-items: center;
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
				font-weight: bold;
			}
	
			.date {
				margin-left: auto;
			}
	
			.more {
				color: #838383;
				font-size: 24rpx;
				margin-left: auto;
	
			}
		}
	
		.chart {
			width: 100%;
			height: 440rpx;
	
			.img {
				width: 100%;
				height: 440rpx;
			}
		}
	
		.infos {
			padding: 0 32rpx;
			display: flex;
			justify-content: space-between;
			text-align: center;
	
			.border {
				margin: auto 0;
				height: 70rpx;
				width: 2rpx;
				background-color: rgba(204, 204, 204, 1);
				;
			}
	
			.item-title {
				color: rgba(119, 119, 119, 1);
			}
	
			.item-value {
				color: rgba(16, 16, 16, 1);
				font-size: 32rpx;
				margin-top: 16rpx;
			}
	
		}
	}
</style>