<template>
	<view>
		<view   class="background" 
		:class="{
			backgroundref:ref
		}"
		>
			<!-- 日期选择器 -->
			<u-picker-select title="日期选择" v-model="tabsFrom.show2" :defaultTime="tabsFrom.show2Index" :endYear="endYear"
				mode="time" :params="params" :noselect="false" @confirm="selector2confirm" @cancel="selector2cancel"
				@reset="selector2reset">
			</u-picker-select>

			<view class="navbar-c">
				<view class="back" @click="backDataMonitoringList">
					<u-icon name="arrow-left" color="#fff" size="36"></u-icon>
				</view>
				<view class="title">
					{{tabsFrom.title}}
				
				</view>
			</view>
			
			<!-- <u-navbar :title="tabsFrom.title" title-color="#101010">
			</u-navbar> -->
		</view>
		
		<!-- 设备选择器 -->
		<u-select title="设备选择" v-model="tabsFrom.show1" :list="tabsFrom.selector1"
			@confirm="selector1confirm" cancel-text="重置" @cancel="selector1cancel">
		</u-select>
		
		<!-- 用电量 -->
		<view class="electricity-consumption" >
			
			
        <!-- 统计 -->
		<view class="statistics-content">
			<!-- @click="gotoUrl('/pages/equipmentDataMonitoring/electricityConsumptionDetail?id='
			+FormData.meterId+'&name='+tabsFrom.title+'&type='+FormData.type)"
			
			 -->
			<view class="statistics-item"
				>
				<view class="item-title">
					<image class="img" src="@/assets/img/meterStatistics@3x.png"></image>统计用水量 (m³)
				</view>
				<view class="item-value">
					<text>{{electricity}}</text> 
					 <u-icon name="arrow-right"  v-if="0"
					color="#cccccc" size="24" ></u-icon>
				</view>
			</view>
			<view class="statistics-item" >
				<view class="item-title item-title2">
					<image class="img" src="@/assets/img/electricityStatistics@3x.png"></image>水费统计(元)
				</view>
				<view class="item-value">
					{{fee}}
				</view>
			</view>
		</view>
			<view class="radio">
				<u-radio-group v-model="value" @change="radioGroupChange">
					<u-radio @change="radioChange" v-for="(item, index) in list" :key="index" :name="item.id"
						:disabled="item.disabled">
						{{item.name}}
					</u-radio>
				</u-radio-group>
			</view>
		</view>
	
		<!-- 远程控制电源开关 -->
		<view class="control" 
		
		v-if="codes&&codes.indexOf('switch')!=-1&&(meterDetail.type!=6)&&meterDetail.allowSwitch">
		<!-- @click="gotoUrl('/pages/tenantList/switchDetail?id='+meterDetail.id)" -->
			<view class="text">
				
				智能监控用水
				 <u-icon name="arrow-right" v-if="false" color="#cccccc" size="24" ></u-icon>
			</view>
			<view class="icon" >
				
			<!-- 	<span>关</span>
				<u-switch size="32" @change="switchBtnApi(meterDetail,$event)"  
				 v-model="meterDetail.switchStatus"   inactive-color="#ff9900" ></u-switch >
				<span>开</span> -->
				
				
				<u-switch-jp size="42" 
				:obj="{
					width: '4em',
					transform:'translateX(300%)',
					sz:['已关闭','已开启'],
					fontSize:'32rpx'
				}"
				@change="switchBtnApi(meterDetail,$event)"  
				 v-model="meterDetail.switchStatus"   inactive-color="#ff9900" ></u-switch-jp >
			</view>
		</view>
		
		<!-- 各时段用电量 -->
		<view class="electricity-chart"   >
			<view class="title">
				<view class="icon">

				</view>
				<view class="text">
					各时段用水量 (m³)

				</view>
				<view class="more" @click="tabsFrom.show2=true,params.day=true">
					{{queryDay}}<u-icon name="arrow-down" color="#bbbbbb"></u-icon>
				</view>
			</view>
			
			<view class="content"
			 style="display: flex;justify-content: center;margin: 40px 0;"
			v-if="hourMap==null">
				
				<div class="uni-toast" style="display: flex;font-size: 60rpx;    color: rgb(192, 196, 204);" >
					<i class="uni-icon_toast uni-loading"
				style="
				    width: 80rpx;
				    height: 80rpx;
					
				"
				></i><p class="uni-toast__content">  </p>加载中...</div>
				
			</view>
			<view class="chart">
				<view id="barEcharts" style="min-height:440rpx;">

				</view>
			</view>
			<view class="total"  >
				<view class="total-item">
					当日用水量合计：{{sumQuantity}} m³
				</view>
				<view class="total-item" v-if="meterDetail&&meterDetail.price">
					当日水费合计：{{(sumQuantity*meterDetail.price).toFixed(2)}}元
				</view>
			</view>
		</view>
		<!-- 异常告警 -->
		<!-- 数据分析 -->
		<view class="data-analysis" >
			<view class="title">
				<view class="icon">
		
				</view>
				<view class="text">
					数据分析
		
				</view>
			</view>
			<view class="grid">
				<u-grid :col="3" :border="false">
					<u-grid-item @click="gotoInfo('chartYoYwater','','')">
						<view class="icon icon7">
							<image class="img" src="@/assets/img/Image@7.png" mode=""></image>
						</view>
						<view class="grid-text">同比分析</view>
					</u-grid-item>
					<u-grid-item @click="gotoInfo('chartMoMwater','','')">
						<view class="icon icon8">
							<image class="img" src="@/assets/img/Image@8.png" mode=""></image>
						</view>
						<view class="grid-text">环比分析</view>
					</u-grid-item>
					<u-grid-item @click="gotoUrl('/pages/equipmentDataMonitoring/electricityStatisticsWater?id='+meterId)">
						<view class="icon icon9">
							<image class="img" src="@/assets/img/Image@9.svg" mode=""></image>
						</view>
						<view class="grid-text">用水统计</view>
					</u-grid-item>
				</u-grid>
			</view>
		</view>

		<view class="equipment-information"  >
			<view class="title">
		
				<view class="icon">
		
				</view>
				<view class="text">
					设备信息
		
				</view>
				<view class="more" @click="equipmentInfosShow=true">
					查看全部<u-icon name="arrow-right" size="24" color="#d4d4d4"></u-icon>
				</view>
			</view>
		
			<view class="infos">
				
				<view class="item" style="width: 40%;" v-if="dtuInfo&&dtuInfo.id">
					<view class="item-title">
						通讯模块
					</view>
					<view class="item-value">
						{{dtuInfo.name}}
						
					</view>
				</view>
				<view class="item" style="width: 20%;" v-else >
					<view class="item-title">
						使用单位
					</view>
					<view class="item-value">
						{{meterDetail.customer}}
						
					</view>
				</view>
				<view class="border">
		
				</view>
				<view class="item" style="width: 40%;">
					<view class="item-title">
						设备编号
					</view>
					<view class="item-value">
						{{meterDetail.deviceNo}}
					</view>
				</view>
				<view class="border">
		
				</view>
				<view class="item" style="width: 30%;">
					<view class="item-title">
						水价
					</view>
					<view class="item-value">
						{{meterDetail.price}}元/吨
					</view>
				</view>
			</view>
		</view>
		
		<!-- 设备信息弹窗 -->
		
		<view class="equipment-popup">
			<u-popup v-model="equipmentInfosShow" mode="bottom"  border-radius="12">
				<view class="content">
					<view class="headline">
						设备信息
					</view>
					<view class="infos">
						<view class="item">
							<view class="item-title">
								设备名称
							</view>
							<view class="item-value">
								{{meterDetail.name}}
							</view>
						</view>
						<view class="item" v-if="false">
							<view class="item-title">
								设备类型
							</view>
							<view class="item-value">
								{{meterDetail.deviceTypeN}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								设备编号
							</view>
							<view class="item-value">
								{{meterDetail.deviceNo}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								产权单位
							</view>
							<view class="item-value">
								{{meterDetail.companyFullName}}
							</view>
						</view>
						<view class="item" @click="toMeterLocation">
							<view class="item-title">
								设备地址
							</view>
							<view class="item-value">
								<span>{{meterDetail.installationAddress}}</span>
								<image class="img" v-if="0"
								 src="@/assets/img/riFill-navigation-fill 1.svg"></image>
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								地址简称
							</view>
							<view class="item-value">
								{{meterDetail.installationAddressSimple}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								使用单位
							</view>
							<view class="item-value">
								{{meterDetail.customer}}
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								水价
							</view>
							<view class="item-value">
								{{meterDetail.price}}元/吨
							</view>
						</view>
						<view class="item">
							<view class="item-title">
								启用时间
							</view>
							<view class="item-value">
								{{meterDetail.enablingTime}}
							</view>
						</view>
						
						<view class="item" v-if="dtuInfo&&dtuInfo.id">
							<view class="item-title">
								通讯模块
							</view>
							<view class="item-value">
								
								{{dtuInfo.name}} {{dtuInfo.imei}}（{{meterDetail.address?meterDetail.address:'无'}}）
							</view>
						</view>
					
					</view>
					<button class="get" @click="equipmentInfosShow=false">知道了</button>
				</view>
			</u-popup>
		
		</view>

		
	</view>
</template>

<script>
	import {
		parseUnixTime,
		beforeTimeStamp,
		getWeek
	} from '@/apis/utils'
	import * as echarts from 'echarts';
	import * as API_water from '@/apis/pagejs/water.js'
	
	import * as API from '@/apis/pagejs/index.js'
	import * as API_energyManage from '@/apis/pagejs/energyManage.js'
	
	import * as API_electricityMeter from '@/apis/pagejs/electricityMeter.js'
	// import * as WxJsApi from '@/apis/utils/wxJsApi.js'

	export default {
		data() {
			return {
				meterDetail: {}, //设备信息
				electricity: 0, //电量统计
				fee: 0, //电费统计
				abnormalRecordsList: [], //异常list
				companyId: '', //企业id
				meterId: '', //设备id
				titleName: '',
				clickType: -1,
				sumQuantity: 0,
				sumFee: 0,
				equipmentInfosShow: false,
				kWhList: [],
				queryDay: '',
				showTop: [0, 0, 0, 0, 0, 0, 0, 0],
				FormData: {
					queryDate: '',
					meterId: '',
					type: 0
				},
				codes:"",
				FormData2: {
					queryDate: '',
					meterId: ''
				},
				myChart: null,
				endYear: '',
				equipmentShow: false,
				multiSelector: [],
				equipmentList: [],
				params: {
					year: true,
					month: true,
					day: true,
					hour: false,
					minute: false,
					second: false
				},
				tabsFrom: {
					show1: false,
					show1Index: 0,
					show2Index: '',
					show2: false,
					show1Text: "全部类型",
					show2Text: "全部时间",
					selector1: [{
							label: '全部类型',
							value: '',
						},
						{
							label: '线上充值',
							value: '1',
						},
						{
							label: '线下充值',
							value: '2',
						},
					]
				},
				background: {
					backgroundColor: '#1677FF',
				},
				list: [{
					id: 1,
					name: '本月',
					disabled: false
				}, {
					id: 4,
					name: '今日',
					disabled: false
				}, {
					id: 2,
					name: '上月',
					disabled: false
				}, {
					id: 3,
					name: '本年',
					disabled: false
				}, {
					id: 0,
					name: '合计',
					disabled: false
				}, {
					id: 10,
					name: '指定月份',
					disabled: false
				}],
				value: '4',
				intervalId: null, // 用于存储间隔ID  
				intervalReady: true, // 用于存储间隔ID 
				ref:false,
				dtuInfo:{},
				hourMap:null,
			};
		},
		onLoad(op) {
			
			this.init(op)
		},
		onReady() {
			// WxJsApi.getWxConfig(['getLocation', 'openLocation', 'addEventListener', 'scanQRCode']).then((res) => {
			// 	// //(res)
			// }).catch(error => {
			// 	//(res)
			// })
		},
		beforeDestroy() {
			this.clearTimer(); // 组件销毁前清除定时器
			this.intervalReady = false;
			//console.log("组件销毁前清除定时器")
		},
		methods: {
			init(op){
			
				if (op.id) {
					
					this.ref=op.ref;
					this.FormData.meterId = op.id;
					this.FormData2.meterId = op.id;
					this.tabsFrom.title = this.replaceLastTwoWords(op.name);
					this.meterId = op.id;
					this.titleName = this.replaceLastTwoWords(op.name);
					this.companyId = op.companyId;
					
				}
				this.endYear = new Date().getFullYear();
				this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
				this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
				this.FormData.type = 4;
				
				this.getElectricityStatistics();
				this.getTimeSlotStatistics();
				//this.getCompanyInfoList();
				//this.getAbnormalAlarmRecord();
				this.getMeterDetails(this.meterId);
			},
			
			switchBtnApiMethod(node,key){
				uni.showLoading({
					title: "加载中",
					mask: true,
				})
				API_water.remoteSwitch({
					meterId:node.id,
					enabled:key
				}).then((res) => {
					uni.hideLoading();
					node.switchStatus=key
					
				}).catch(error => {
					
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			switchBtnApi(node,key){
				uni.showModal({
					confirmColor:`${key?'#3CC51F':'red'}`,
					confirmText:`${key?'开启':'关闭'}`,
					content: `确认是否要"${key?'开启':'关闭'}"${this.replaceLastTwoWords(node.name)}`,
					title: "提示",
					success:res=> {
						if(res.confirm){
							this.switchBtnApiMethod(node,key);
						}else{
							node.switchStatus=!key
						}
					}
				})
				console.log(node,key)
			},
			toMeterLocation() {
				// WxJsApi.openLocation({
				// 	latitude: parseFloat(this.meterDetail.latitude), //目的地latitude
				// 	longitude: parseFloat(this.meterDetail.longitude), //目的地longitude
				// 	name: this.meterDetail.name,
				// 	address: this.meterDetail.installationAddress,
				// 	scale: 15, //地图缩放大小，可根据情况具体调整
				// 	success(res) {
				// 		uni.hideLoading()
				// 	},
				// 	complete() {
				// 		//	uni.hideLoading()
				// 	}
				// });
			},
			getMeterDetails(meterId) {
				
				uni.showLoading({
					title: "加载中",
					mask: true,
				})
				API_water.meterDetails({
					meterId: meterId
				}).then((res) => {
					uni.hideLoading();
					this.meterDetail = res.data.meter;
					this.dtuInfo = res.data.dtuInfo;
					this.meterDetail.name=this.replaceLastTwoWords(this.meterDetail.name)
					this.codes =this.carhelp.getPersonInfo().codes;
					
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			clearTimer() {
				if (this.intervalId) {
					clearInterval(this.intervalId); // 清除定时器  
					this.intervalId = null; // 重置定时器ID  
				}
			},
			startInterval() {
				return
				this.clearTimer(); // 组件销毁前清除定时器 
				this.intervalId = setInterval(() => {
					// 每隔5秒运行的代码  
					// console.log('这段代码每隔5秒运行一次');
					this.getElectricityStatistics(true)
					this.getTimeSlotStatistics(true)
				}, 60000);
			},
			gotoInfo(path, type, name) {
				if (!this.FormData.meterId) {
					uni.showToast({
						title: "未查询到水表",
						icon: "none"
					})

					return
				}
				uni.navigateTo({
					url: "/pages/equipmentDataMonitoring/" + path + "?id=" + this.FormData.meterId + "&type=" + type +
						"&typeName=" + name+"&title="+this.tabsFrom.title
				})

			},

			// 异常告警记录
			getAbnormalAlarmRecord() {
				var queryDate = parseUnixTime(new Date(), '{y}-{m}');

				uni.showLoading({
					title: "加载中",
					mask: true,
				})
				API.alarmRecord({
					queryDate: queryDate,
					configId: '',
					pageIndex: 1,
					pageSize: 2,
					companyId: this.companyId,
					meterId: this.meterId
				}).then((res) => {
					uni.hideLoading();
					this.abnormalRecordsList = res.data.data;
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			titleCk() {
				if(this.tabsFrom.selector1.length){
					this.tabsFrom.show1 = true
				}
				
				
			},
			selector1confirm(e) {
				console.log(e)
				// var index = e[2];
				// this.tabsFrom.show1Index = index;
				if (e[2].value != null) {
					this.tabsFrom.show1Text = e[2].label;
					this.tabsFrom.title = e[2].label;

					this.FormData.meterId = e[2].value;
					this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					this.FormData2.meterId = e[2].value;
					this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					//this.meterId =e[2].value;
					this.FormData.type = 4;
					this.value = '4';

					this.getTimeSlotStatistics();
					this.getElectricityStatistics();
					this.getMeterDetails(e[2].value);
				}
			},
			selector1cancel() {
				this.tabsFrom.show1Text = this.titleName;
				this.tabsFrom.title = this.titleName;

				this.FormData.meterId = this.meterId;
				this.FormData.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
				this.FormData2.meterId = this.meterId;
				this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');

				this.FormData.type = 4;
				this.value = '4';

				this.getTimeSlotStatistics();
				this.getElectricityStatistics();
				this.getMeterDetails(this.meterId);
			},
			queryDate(queryTime, day) {

				if (day) {
					this.FormData2.queryDate = queryTime;
					//this.FormData2.type =day?"9":"10"
					//this.value="-1"

					this.getTimeSlotStatistics();
				} else {

					this.FormData.queryDate = queryTime + "-01";
					this.FormData.type = 10;
					this.value = "10";
					this.list[5].name = queryTime;

					this.getElectricityStatistics();
				}
			},
			getCompanyInfoList() {
				
			},
			getTimeSlotStatistics(interval) {
				if (!interval) {
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}

				this.queryDay = parseUnixTime(new Date(this.FormData2.queryDate), '{y}年{m}月{d}日');
				API_water.timeSlotStatistics(this.FormData2).then((response) => {
					if (!interval) {
						uni.hideLoading();
					}
					this.hourMap = response.data.hourMap;
					this.sumQuantity = response.data.consumptionMap.consumption;
					
					this.getBarCharts(this.hourMap, interval);

					if (!interval) {
						this.startInterval(); // 组件挂载后开始间隔  
					}
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getElectricityStatistics(interval) {
				
				if (!interval) {
					uni.showLoading({
						title: "加载中",
						mask: true,
					})
				}
				var obj = {
					...this.FormData
				}
				
				if (obj.type != 10) {
					this.list[5].name = '指定月份';
				}
				
				// if(obj.type==10){
				// 	obj.queryDate+="-01"
				// }
				API_water.waterQuantityStatistics(obj).then((response) => {
					if (!interval) {
						uni.hideLoading();
					}
					
					
					this.showTop = [0, 0, 0, 0, 0, 0, 0, 0]
					var electricity = response.data.consumptionMap.consumption + "";
					this.electricity = response.data.consumptionMap.consumption;
					this.fee = response.data.amount;

					if (electricity) {
						var sz = electricity.split(".")
						var str1 = sz[0];
						var str2 = [];
						if (sz.length > 1) {
							str2 = sz[1];
							this.showTop[7] = str2[0];
						}
						var j = 0;
						for (var i in str1) {
							if (i != undefined) {
								this.showTop[6 - str1.length + j + 1] = str1[i]
							}
							j++;
						}
						this.$forceUpdate()
					}

					if (!interval) {
						this.startInterval(); // 组件挂载后开始间隔  
					}
				}).catch(error => {
					uni.showToast({
						title: error,
						icon: "none"
					})
				})
			},
			getBarCharts(list, interval) {
				if (!this.myChart) {
					this.myChart = echarts.init(document.getElementById('barEcharts'), null, {
						// width: uni.upx2px(700),
						height: uni.upx2px(480)
					});
				}
				if (!interval) {
					this.myChart.clear();
				}

				var data1 = [];
				var data2 = [];
				var data3 = [];
				// var sumQuantity=0
				for (var i in list) {
					data1.push(i)
					data2.push(list[i].consumption)
					data3.push(list[i].consumptionAverage)
					// sumQuantity+=list[i]

				}
				var axisLabel = {
					rotate: 40,
					interval: 0,
					textStyle: {
						color: "#333"
					}
				}

				if (data1.length < 4) {
					axisLabel = {

						interval: 0,
						textStyle: {
							color: "#333"
						},
					}
				}

				// this.sumQuantity = sumQuantity.toFixed(2);
				var headitemby = "";
				var showkey = "";
				var option = {
					tooltip: {
						trigger: 'axis',
						axisPointer: {
							type: 'shadow'
						},
						formatter: (value) => {
							
							var name = value[0].name;
							var obj=list[name]
							var text= `<p>${name}</p>`
														
							if(this.meterDetail.price){
								text += `<p>水价：`+this.meterDetail.price+`元/吨</p>`
							}
							if (obj.consumption != undefined) {
								text += `<p>用水量：${obj.consumption} m³</p>`
								text += `<p>平均水量：${obj.consumptionAverage} m³</p>`
								
							}
							
							if (obj.amount != undefined) {
								text += ` <p>水费：${obj.amount}元</p>`
							}
							return text

						}
					},
					legend: {
					  
					  },
					grid: {
						top: 60,
						left: 5,
						right: 10,
						bottom: 20,
						containLabel: true
					},
					xAxis: {
						type: 'category',
						data: data1,

						axisLabel: axisLabel,
					},
					yAxis: {
						type: 'value',

					},
					series: [{
						name: '用水量',
						data: data2,
						type: 'bar',
						 barGap:"0%",
						label: {
							show: true,
							position: 'top',
							color: '#5C7BD9'
						}
					},
					{
						name: '平均用水量',
						data: data3,
						type: 'bar',
						label: {
							show: true,
							position: 'top',
							color: '#5C7BD9'
						}
					}
					]
				}
				console.log(option)
				this.myChart.setOption(option);
			},
			selector2confirm(e) {
				this.tabsFrom.show2Text = e.year + "年" + e.month + "月"

				this.tabsFrom.show2Index = e.year + "-" + e.month
				if (e.day) {
					this.tabsFrom.show2Text += e.day + "日"
					this.tabsFrom.show2Index += '-' + e.day

					this.queryDate(this.tabsFrom.show2Index, true)
				} else {
					this.queryDate(this.tabsFrom.show2Index, false)
				}
			},
			selector2cancel() {
				if(this.clickType != -1) {
					
				}
				this.value = this.clickType;
			},
			selector2reset(e) {
				console.log(e)
				this.tabsFrom.show2Text = '全部时间'
				this.tabsFrom.show2Index = '';

				if (e.day) {
					this.FormData2.queryDate = parseUnixTime(new Date(), '{y}-{m}-{d}');
					this.queryDay = parseUnixTime(new Date(this.FormData2.queryDate), '{y}年{m}月{d}日');
					this.getTimeSlotStatistics();
				} else {
					 this.clickType="4"
					this.FormData.type = this.clickType;
					this.value = this.clickType;
					
					this.getElectricityStatistics();
				}
			},
			// 选中某个单选框时，由radio时触发
			radioChange(e) {
				console.log(`选择前的值: ${this.value}`);
				
			},
			// 选中任一radio时，由radio-group触发
			radioGroupChange(e) {
				console.log(e)
				this.clickType = this.FormData.type;
				
				this.FormData.type = e;
				if (e == 10) {
					this.tabsFrom.show2 = true;
					this.params.day = false;
				} else {
					this.list[5].name = '指定月份'
					this.getElectricityStatistics();
				}
			},
			backDataMonitoringList() {
				uni.navigateBack()
			},
		}
	};
</script>


<style lang="scss" scoped>
	

	/deep/.u-select__header__title {
		font-size: 36rpx;
		font-weight: bold;
	}

	.navbar-c {
		background-color: rgba(22, 119, 255, 1);
		position: fixed;
		top: 0;
		left: 0;
		right: 0;
		z-index: 999;

		.back {
			z-index: 999;
			width: 200rpx;
		}

		.title {
			color: #fff;
			display: flex;
			align-items: center;
			justify-content: center;
		}

		.right {
			.img {
				width: 48rpx;
				height: 48rpx;
			}
		}
	}
	
	.navbar-d {
		background-color: rgba(22, 119, 255, 1);
		
		position: relative;
		top: -240rpx;
		left: 0;
		right: 0;
		z-index: 999;
	
		.back {
			z-index: 999;
			width: 200rpx;
		}
	
		.title {
			font-size: 36rpx;
			color: #fff;
			display: flex;
			align-items: center;
			justify-content: center;
		}
	
		.right {
			.img {
				width: 48rpx;
				height: 48rpx;
			}
		}
	}
	// /deep/.uicon-nav-back {
	// 	color: #fff !important;

	// }

	.background {
		background-color: rgba(22, 119, 255, 1);
		padding-top: 88rpx;
		height: 300rpx;
		//padding-bottom: 100rpx;
          position: relative;

		/deep/.u-border-bottom:after {
			border: none;
		}

		.u-nav-slot {
			margin-right: 32rpx;

			.img {
				width: 48rpx;
				height: 48rpx;
				vertical-align: middle;
			}
		}


	}


	.background::after {
	
		  content: '';
		  position: absolute;
		  bottom:-39rpx;
		  width: 100%;
		  height: 40rpx; /* 弧形的高度 */
		  background-color: rgba(22, 119, 255, 1); /* 弧形的颜色 */
		  border-radius: 50%; /* 创建圆形 */
		  border-top-left-radius: 0;
		  border-top-right-radius: 0;

	}
	.backgroundref{
		height: 220rpx;
		    background-color: #f2f4f6;
			
	}
	.backgroundref::after {
		 background-color: #f2f4f6;
	}
	// // 日期
	.date-box {
		display: flex;
		align-items: center;
		justify-content: space-between;
		margin: 24rpx 32rpx;


		.item {
			border-radius: 8px;
			background-color: rgba(255, 255, 255, 0.1);
			border: 1px solid rgba(255, 255, 255, 0.15);
			width: 120rpx;
			height: 120rpx;
			color: #fff;
			text-align: center;
			display: flex;
			flex-direction: column;
			justify-content: center;

			.date {
				font-size: 40rpx;


			}

		}

		.item-today {
			background-color: rgba(255, 255, 255, 1);
			position: relative;

			.date {
				color: rgba(22, 119, 255, 1);
			}

			.week {
				color: rgba(16, 16, 16, 1);
			}

			.dot {
				width: 10rpx;
				height: 10rpx;
				background-color: rgba(255, 150, 0, 1);
				border-radius: 999px;
				position: absolute;
				bottom: -5rpx;
				left: 50%;
				transform: translateX(-50%);
			}
		}
	}

	// 用电量
	.electricity-consumption {
		background-color: #fff;
		padding: 32rpx 32rpx 0rpx;
		border-radius: 8px;
		margin: -188rpx 32rpx 0;
		position: relative;
		border: 1px solid rgba(255,255,255,1);
		background: linear-gradient(180deg, rgba(187,216,255,1) 0%,rgba(255,255,255,1) 63%);
		// 统计
		.statistics-content{
			display: flex;
			align-items: center;
			justify-content: space-between;
			
			
			.statistics-item{
				width: 300rpx;
				padding: 24rpx 0 24rpx 24rpx;
				border-radius: 8px;
				box-shadow: 0px 0px 8px 0px rgba(22,119,255,0.3);
				background-color: #fff;
			}
			.item-title{
				color: rgba(22,119,255,1);
				font-size: 32rpx;
				display: flex;
				align-items: center;
				font-weight: bold;
				.img{
					width: 32rpx;
					height: 32rpx;
					vertical-align: middle;
					margin-right: 4rpx;
				}
			}
			.item-title2{
				color: rgba(129,97,255,1);
			}
			.item-value{
				color: rgba(16,16,16,1);
				font-size: 48rpx;
				font-weight: bold;
				margin-top: 8rpx;
				overflow: hidden;
				white-space: nowrap;
				text-overflow: ellipsis;
				
				text{
					display: inline-block;
					width: 80%;
					margin-right: 4rpx;
				}
			}
		}

		.title {
			color: rgba(16, 16, 16, 1);
			font-size: 36rpx;

		}

		.degree {
			display: flex;
			margin-top: 32rpx;

			.item {
				margin-right: 6rpx;
				text-align: center;

				.item-text {
					color: rgba(16, 16, 16, 1);
				}

				.item-number {
					margin-top: 24rpx;
					width: 72rpx;
					height: 96rpx;
					background-color: rgba(16, 16, 16, 1);
					color: #fff;
					font-size: 72rpx;

				}

				.decimal {
					background-color: #900005;
				}
			}
		}


		// .tab {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #fff;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 0rpx;
		// 	right: 0rpx;
		// 	color: #101010;
		// 	color: rgba(16, 16, 16, 1);
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	z-index: 999;
		// 	text-indent: 16rpx;
		// }

		// .tab2 {
		// 	width: 240rpx;
		// 	height: 0;
		// 	border-width: 0px 48rpx 72rpx 0px;
		// 	border-radius: 8px 8px 0 0;
		// 	border-style: none solid solid none;
		// 	border-color: transparent transparent #D4DBE4;
		// 	position: absolute;
		// 	top: -72rpx;
		// 	left: 210rpx;
		// 	right: 0rpx;
		// 	color: #777777;
		// 	text-align: center;
		// 	line-height: 72rpx;
		// 	text-indent: 16rpx;
		// }

		.radio {
			margin-top: 24rpx;
            padding-left: 8rpx;
			/deep/.u-radio {
				margin-bottom: 8px;
				min-width: 25% !important;
				
				
				
				
			}
			/deep/.u-radio__label{
				margin-left: 24rpx;
				font-size: 28rpx;			;
			}

		}
	}
   
    // 远程控制电源开关
	.control{
		display: flex;
		align-items: center;
		justify-content: space-between;
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;
		.text{
			color: rgba(51,51,51,1);
			font-size: 36rpx;
			font-weight: bold;
		}
		.icon{
			img{
				width: 64rpx;
				height: 64rpx;
			}
		}
	}


	//各时段用电量
	.electricity-chart {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
				justify-content: space-between;
			padding: 0 32rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {

				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
				font-weight: bold;
			}

			.more {
				margin-left: auto;
				border: 1px solid rgba(187,187,187,1);
				border-radius: 4px;
				padding: 8rpx;
				font-size: 24rpx;
			}
		}
		.total{
			text-align: center;
			color: rgba(51,51,51,1);
			font-weight: bold;
		}

		.chart {
			width: 100%;
			height: 500rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}
	}

	.equipment-information {
		margin: 24rpx 32rpx;
		padding: 40rpx 0rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			padding: 0 32rpx;
			margin-bottom: 40rpx;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				display: flex;
				align-items: center;
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
				font-weight: bold;
			}

			.date {
				margin-left: auto;
			}

			.more {
				color: #838383;
				font-size: 24rpx;
				margin-left: auto;

			}
		}

		.chart {
			width: 100%;
			height: 440rpx;

			.img {
				width: 100%;
				height: 440rpx;
			}
		}

		.infos {
			padding: 0 32rpx;
			display: flex;
			justify-content: space-between;
			text-align: center;

			.border {
				margin: auto 0;
				height: 70rpx;
				width: 2rpx;
				background-color: rgba(204, 204, 204, 1);
				;
			}

			.item-title {
				color: rgba(119, 119, 119, 1);
			}

			.item-value {
				color: rgba(16, 16, 16, 1);
				font-size: 32rpx;
				margin-top: 16rpx;
				
				overflow: hidden;
				// white-space: nowrap;
				// text-overflow: ellipsis;
			}

		}
	}

	// 异常告警
	.abnormal {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.headline {
			display: flex;
			align-items: center;
			justify-content: space-between;
		}

		.title {
			display: flex;
			align-items: center;
			font-weight: bold;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.more {
			color: #838383;
			font-size: 24rpx
		}

		.details {
			margin-top: 40rpx;

			.item {
				display: flex;
				align-items: center;
				justify-content: space-between;
				margin-top: 32rpx;

				.name {
					color: rgba(51, 51, 51, 1);
				}

				.time {
					color: rgba(119, 119, 119, 1);
					font-size: 24rpx;
					display: flex;
					align-items: center;
					.more{
						margin-left: 4rpx;
					}
				}
			}
		}

	}

	// 能源监测
	.energy-inspection,
	.data-analysis {
		margin: 24rpx 32rpx;
		padding: 40rpx 32rpx;
		background-color: #fff;
		border-radius: 8px;

		.title {
			display: flex;
			align-items: center;
			font-weight: bold;

			.icon {
				width: 36rpx;
				height: 36rpx;
				background-color: rgba(182, 212, 255, 1);
				border: 6px solid rgba(22, 119, 255, 1);
				border-radius: 100px;
			}

			.text {
				color: rgba(51, 51, 51, 1);
				font-size: 36rpx;
				margin-left: 16rpx;
			}
		}

		.grid {
			.icon {
				width: 128rpx;
				height: 128rpx;
				border-radius: 12px;
				background-color: rgba(35, 186, 178, 1);
				display: flex;
				align-items: center;
				justify-content: center;
				margin-bottom: 16rpx;

				.img {
					width: 80rpx;
					height: 80rpx;
				}
			}

			.icon2 {
				background-color: rgba(42, 186, 72, 1);
			}

			.icon3 {
				background-color: rgba(78, 96, 246, 1);
			}

			.icon4 {
				background-color: rgba(22, 119, 255, 1);
			}

			.icon5 {
				background-color: rgba(35, 186, 178, 1);
			}

			.icon6 {
				background-color: rgba(42, 186, 72, 1);
			}

			.icon7 {
				background-color: rgba(22, 119, 255, 1);
			}

			.icon8 {
				background-color: rgba(35, 186, 178, 1);
			}

			.icon9 {
				background-color: rgba(42, 186, 72, 1);
			}

			.grid-text {
				color: #333333;
			}
		}
	}


	// 设备信息弹窗
	.equipment-popup {

		.content {

			padding: 32rpx;

			.headline {
				color: rgba(16, 16, 16, 1);
				font-size: 36rpx;
				text-align: center;
				font-weight: bold;
				margin-bottom: 24rpx;
			}

			.infos {
				//padding-bottom: 100rpx;

				.item:last-of-type {
					border: none;
				}

				.item {
					display: flex;
					align-items: center;

					//line-height: 48rpx;
					padding: 20rpx 0;
					border-bottom: 1px solid #cccccc;

					.item-title {
						color: rgba(51, 51, 51, 1);
						width: 200rpx;
					}

					.item-value {
						color: #666666;
						flex: 1;
						margin-left: 16rpx;
						display: flex;
						align-items: center;
						justify-content: space-between;
						
						.img{
							width: 32rpx;
							height: 32rpx;
							transform: rotate(90deg);
							margin-left: 96rpx;
						}
					}
				}

			}

			.get {
				height: 80rpx;
				line-height: 80rpx;
				border-radius: 4px;
				background-color: rgba(22, 119, 255, 1);
				color: rgba(255, 255, 255, 1);
				font-size: 32rpx;
			}
		}
	}




	// 创建工单
	.create-order {
		width: 120rpx;
		height: 120rpx;
		border-radius: 20px;
		background: linear-gradient(180.29deg, rgba(255, 124, 112, 1) 0.9%, rgba(255, 79, 63, 1) 100.4%);
		box-shadow: 0px 2px 6px 0px rgba(0, 0, 0, 0.4);
		text-align: center;
		display: flex;
		flex-direction: column;
		justify-content: center;
		align-items: center;
		position: fixed;
		right: 32rpx;
		bottom: 64rpx;

		.img {
			width: 56rpx;
			height: 56rpx;
			vertical-align: middle;
		}

		.text {
			color: rgba(255, 255, 255, 1);
			font-size: 22rpx;
		}
	}
</style>